CAPTION='$(lang de:"WireGuard Konfiguration" en:"WireGuard configuration")'
DESCRIPTION='$(lang de:"Hier muss die entsprechende WireGuard Konfiguration eingetragen werden." en:"The WireGuard configuration has to be inserted here.")'
CONFIG_FILE='/tmp/flash/wireguard/wireguard.conf'
CONFIG_SAVE='modsave flash; /mod/etc/init.d/rc.wireguard restart'
CONFIG_TYPE='text'
