CAPTION='php.ini'
DESCRIPTION='$(lang de:"Die Konfigurationsparameter f&uuml;r PHP werden im Flash gespeichert. Damit diese nicht allzuviel Platz belegen sind alle Kommentare entfernt worden. Eine Dokumentation der php.ini ist auf der <a href=\"http://de.php.net/ini.core\">PHP Webseite</a> zu finden.<br />Nach erfolgter Konfiguration muss der Webserver neu gestartet werden." en:"These configuration parameters are stored in Flash RAM where there is not too much space. Therefore, all comments have been removed from the php.ini file. A documentation of the php.ini file can be found on the <a href=\"http://de.php.net/ini.core\">PHP website</a><br />After re-configuration, the webserver has to be restarted.")'
CONFIG_FILE='/tmp/flash/php.ini'
CONFIG_SAVE='modsave flash'
CONFIG_TYPE='text'
TEXT_ROWS=30
