CONFIG_FILE='/tmp/flash/openntpd/ntpd.conf'
CONFIG_SAVE='modsave flash; if pidof ntpd > /dev/null; then echo ""; /mod/etc/init.d/rc.openntpd restart; fi'
CONFIG_TYPE='text'

CAPTION='OpenNTPD config'
