CAPTION='$(lang de:"lighttpd: Zus&auml;tzliche Konfigurationsoptionen (f&uuml;r Experten)" en:"lighttpd: Additional config options (for experts)")'
DESCRIPTION='$(lang de:"Mehr Infos: <a TARGET=\"_blank\" href=\"http://redmine.lighttpd.net/wiki/lighttpd\">hier</a>. Falls ein Modul geladen werden soll, muss es mit server.modules += ( \"MODULE\" ) konfiguriert werden.<br />Nutze diese Box unter anderem f&uuml;r die Konfiguration von virtuellen Servern. Bitte beachte, dass das Dokumentenverzeichnis beim Starten von lighttpd existeren muss (d.h. keine USB disk)." en:"more information: <a TARGET=\"_blank\" href=\"http://redmine.lighttpd.net/wiki/lighttpd\">here</a>. In case a new module is to be included, please use server.modules += ( \"MODULE\" ). Use this box for the configuration of virtual servers. Please note that the document root for the virtual server must exist prior to starting the server (i.e. no USB disk).")'
CONFIG_FILE='/tmp/flash/lighttpd/add'
CONFIG_SAVE='modsave flash; if pidof lighttpd > /dev/null; then echo ""; /mod/etc/init.d/rc.lighttpd restart; fi'
CONFIG_TYPE='text'
