CAPTION='IGMPproxy: config'

CONFIG_FILE='/tmp/flash/igmpproxy/config'
CONFIG_SAVE='modsave flash; if pidof igmpproxy > /dev/null; then echo ""; /mod/etc/init.d/rc.igmpproxy restart; fi'
CONFIG_TYPE='text'

TEXT_ROWS=25

