CAPTION='Aiccu: aiccu.sh'
DESCRIPTION='$(lang de:"Wird nach Verbindungsaufbau ausf&uuml;hrt." en:"Will be executed after the connection was established.")
$(lang de:"Als Parameter wird das Interface &uuml;bergeben" en:"Executed with the interface as parameter.")'

CONFIG_FILE='/tmp/flash/aiccu/aiccu.sh'
CONFIG_SAVE='chmod +x /tmp/flash/aiccu/aiccu.sh; modsave flash; if pidof aiccu > /dev/null; then echo ""; /mod/etc/init.d/rc.aiccu restart; fi'
CONFIG_TYPE='text'

TEXT_ROWS=40
