CAPTION='rc.custom'
DESCRIPTION='rc.custom $(lang de:"Skript wird am Ende des Bootprozesses aufgerufen" en:"script is executed at the end of the boot process")'

CONFIG_FILE='/tmp/flash/rc.custom'
CONFIG_SAVE='modsave flash;'
CONFIG_TYPE='text'