CAPTION='Crontab'

CONFIG_FILE='/tmp/flash/crontab.save'
CONFIG_SAVE='cp /tmp/flash/crontab.save /var/spool/cron/crontabs/root; modsave flash; if [ -n "$(pidof crond)" ]; then echo ""; /mod/etc/init.d/rc.crond restart; fi'
CONFIG_TYPE='text'
