CAPTION='Stunnel: $(lang de:"Privater Schl&uuml;ssel" en:"private key")'
DESCRIPTION='$(lang de:"Hier wird die .pem Datei des privaten Schl&uuml;ssels f&uuml;r den Server-Modus hinterlegt. Diese Datei kann in der <i>key</i> Option mit dem Wert '/tmp/flash/stunnel/key.pem' unter den Stunnel-Diensten verwendet werden.<br/>Weitere Informationen sind in der <a href='http://www.stunnel.org/faq/stunnel.html#item_key__3d_keyfile' target='_blank'>Stunnel FAQ</a> zu finden." en:"The .pem private key file for the server mode is saved here. This file can be used for the <i>key</i> option with the value '/tmp/flash/stunnel/key.pem' for the stunnel services.<br/>More infos about this file can be found in the <a href='http://www.stunnel.org/faq/stunnel.html#item_key__3d_keyfile' target='_blank'>Stunnel FAQ</a>.")'

CONFIG_FILE='/tmp/flash/stunnel/key.pem'
CONFIG_SAVE='chmod 600 /tmp/flash/stunnel/key.pem; modsave flash; [ "$(/mod/etc/init.d/rc.stunnel status)" != "stopped" ] && /mod/etc/init.d/rc.stunnel restart'
CONFIG_TYPE='text'
