CAPTION='Stunnel: $(lang de:"Zertifikats-Kette" en:"certificate chain")'
DESCRIPTION='$(lang de:"Hier wird die .pem Datei mit der Zertifikats-Kette (&ouml;ffentliche Schl&uuml;ssel) hinterlegt. Diese Datei kann in der <i>cert</i> Option mit dem Wert '/tmp/flash/stunnel/certs.pem' unter den Stunnel-Diensten verwendet werden.<br/>Weitere Informationen sind in der <a href='http://www.stunnel.org/faq/stunnel.html#item_cert__3d_pemfile' target='_blank'>Stunnel FAQ</a> zu finden." en:"The .pem file for the certificate chain (public keys) is saved here. This file can be used for the <i>certs</i> option with the value '/tmp/flash/stunnel/certs.pem' for the stunnel services.<br/>More infos about this file can be found in the <a href='http://www.stunnel.org/faq/stunnel.html#item_cert__3d_pemfile' target='_blank'>Stunnel FAQ</a>.")'

CONFIG_FILE='/tmp/flash/stunnel/certs.pem'
CONFIG_SAVE='chmod 600 /tmp/flash/stunnel/certs.pem; modsave flash; [ "$(/mod/etc/init.d/rc.stunnel status)" != "stopped" ] && /mod/etc/init.d/rc.stunnel restart'
CONFIG_TYPE='text'
