CONFIG_FILE='/tmp/flash/siproxd/siproxd.conf'
CONFIG_SAVE='modsave flash; if [ "$(/mod/etc/init.d/rc.siproxd status)" = "running" ]; then /mod/etc/init.d/rc.siproxd restart; fi;'
CONFIG_TYPE='text'
CAPTION='Siproxd: siproxd.conf'
