CAPTION='$(lang de:"Konfiguration" en:"Configuration")'

CONFIG_FILE='/tmp/flash/isc-dhcp/isc-dhcpd.conf'
CONFIG_SAVE='modsave flash; /mod/etc/init.d/rc.isc-dhcp restart'
CONFIG_TYPE='text'
