CAPTION="MySQL: $(lang de:"Eigene Konfigurationsoptionen" en:"Custom configuration options")"
DESCRIPTION="$(lang de:"Dokumentation" en:"Documentation"): <a target=blank href=https://dev.mysql.com/doc/refman/5.1/en/server-system-variables.html>https://dev.mysql.com/doc/refman/5.1/en/server-system-variables.html</a>"

CONFIG_FILE='/tmp/flash/mysql/my.cnf'
CONFIG_SAVE='modsave flash; if pidof mysqld > /dev/null; then echo ""; /mod/etc/init.d/rc.mysql restart; fi'
CONFIG_TYPE='text'

TEXT_ROWS=30

