CAPTION='Freetz: rc.custom'
DESCRIPTION="$(lang de:"Skript wird am Ende des Bootprozesses aufgerufen" en:"script is executed at the end of the boot process")"

CONFIG_FILE='/tmp/flash/mod/rc.custom'
CONFIG_SAVE='modsave flash;'
CONFIG_TYPE='text'
