CAPTION='sockd.conf'

CONFIG_FILE='/tmp/flash/dante/sockd.conf'
CONFIG_SAVE='modsave flash; killall -0 danted && /mod/etc/init.d/rc.dante restart'
CONFIG_TYPE='text'

