CAPTION='hiawatha_extra.conf'

CONFIG_FILE='/tmp/flash/hiawatha/hiawatha_extra.conf'
CONFIG_SAVE='modsave flash; if pidof hiawatha > /dev/null; then echo ""; /mod/etc/init.d/rc.hiawatha restart; fi'
CONFIG_TYPE='text'

TEXT_ROWS=30
